– 1 –

Table 1. Galaxy Candidates for Intervening Systems

System ID ⟨z_{abs}⟩^a Candidate Galaxy D^c IDs^b (kpc)

S1 1.2056 · · · · · · S2 1.7874 · · · · · · S3 2.0136 Q2343-MD59 190 S4 2.1732^d Q2343-BX429 66 Q2343-MD62 227 Q2343-BX391 346 Q2343-BX389 443 S5 2.1863 Q2343-D25 86 Q2343-BX484 338 S6 2.3154 · · · · · · S7 2.3281 · · · · · · S8 2.3799 Q2343-D29 364 S9 2.4373 · · · · · · S10 2.4647 · · · · · · S11 2.4859 · · · · · ·

aThe mean absorption redshift of the system.

bPossible galaxy identifications for the intervening systems (see Steidel/Pettini et al.).

cDistance of candidate galaxy from the line of sight to Q2343-BX415 (assuming H_0=70 kms^{−1}Mpc^{−1}, Ω_M =0.3 and Ω_Λ=0.7).

dMultiple components observed in absorption system.